LIBRARY     CoolProp.dll
DESCRIPTION "CoolProp fluid property library"
EXPORTS
  AbstractState_factory = _AbstractState_factory@20
  AbstractState_free = _AbstractState_free@16
  AbstractState_keyed_output = _AbstractState_keyed_output@20
  AbstractState_set_fractions = _AbstractState_set_fractions@24
  AbstractState_update = _AbstractState_update@36
  F2K = _F2K@8
  HAProps = _HAProps@40
  HAPropsSI = _HAPropsSI@40
  K2F = _K2F@8
  PhaseSI = _PhaseSI@36
  Props1 = _Props1@8
  Props1SI = _Props1SI@8
  Props = _Props@32
  PropsS = _PropsS@32
  PropsSI = _PropsSI@32
  get_debug_level = _get_debug_level@0
  get_fluid_param_string = _get_fluid_param_string@16
  get_global_param_string = _get_global_param_string@12
  get_input_pair_index = _get_input_pair_index@4
  get_param_index = _get_param_index@4
  get_parameter_information_string = _get_parameter_information_string@12
  haprops_ = _haprops_@32
  hapropssi_ = _hapropssi_@32
  propssi_ = _propssi_@28
  redirect_stdout = _redirect_stdout@4
  saturation_ancillary = _saturation_ancillary@24
  set_debug_level = _set_debug_level@4
  set_reference_stateD = _set_reference_stateD@36
  set_reference_stateS = _set_reference_stateS@8
