; This is to support renaming of electron.exe. node-gyp has hard-coded
; executable names which it will recognise as node. This module definition
; file claims that the electron executable is in fact named "node.exe",
; which is one of the executable names that node-gyp recognizes.
; See https://github.com/nodejs/node-gyp/commit/52ceec3a6d15de3a8f385f43dbe5ecf5456ad07a
NAME node.exe
